-- @operation: export
-- @entity: batch
-- @name: Update to exact Quality Definitions
-- @exportedAt: 2026-05-23T16:18:52.181Z
-- @opIds: 10670, 10671, 10672, 10673, 10674, 10675, 10676, 10677, 10678, 10679, 10680, 10681, 10682, 10683, 10684, 10685, 10686, 10687, 10688, 10689, 10690, 10691, 10692, 10693, 10694, 10695, 10696, 10697, 10698, 10699, 10700, 10701, 10702, 10703, 10704, 10705, 10706, 10707, 10708, 10709, 10710, 10711, 10712, 10713, 10714, 10715, 10716, 10717, 10718, 10719, 10720, 10721, 10722, 10723, 10724, 10725, 10726, 10727, 10728, 10729, 10730

-- --- BEGIN op 10670 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 51, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'Bluray-1080p' and "min_size" = 51 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10670

-- --- BEGIN op 10671 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 102, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'Bluray-2160p' and "min_size" = 102 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10671

-- --- BEGIN op 10672 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 26, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'Bluray-720p' and "min_size" = 26 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10672

-- --- BEGIN op 10673 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 34, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'HDTV-1080p' and "min_size" = 34 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10673

-- --- BEGIN op 10674 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 85, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'HDTV-2160p' and "min_size" = 85 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10674

-- --- BEGIN op 10675 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 17, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'HDTV-720p' and "min_size" = 17 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10675

-- --- BEGIN op 10676 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 102, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'Remux-1080p' and "min_size" = 102 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10676

-- --- BEGIN op 10677 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 187.4, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'Remux-2160p' and "min_size" = 187 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10677

-- --- BEGIN op 10678 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 13, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBDL-1080p' and "min_size" = 13 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10678

-- --- BEGIN op 10679 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 34.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBDL-2160p' and "min_size" = 35 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10679

-- --- BEGIN op 10680 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 13, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBDL-720p' and "min_size" = 13 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10680

-- --- BEGIN op 10681 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 13, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBRip-1080p' and "min_size" = 13 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10681

-- --- BEGIN op 10682 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 34.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBRip-2160p' and "min_size" = 35 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10682

-- --- BEGIN op 10683 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 13, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBRip-720p' and "min_size" = 13 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10683

-- --- BEGIN op 10684 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 50.8, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'Bluray-1080p' and "min_size" = 51 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10684

-- --- BEGIN op 10685 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 25.7, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'Bluray-720p' and "min_size" = 26 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10685

-- --- BEGIN op 10686 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 33.8, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'HDTV-1080p' and "min_size" = 34 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10686

-- --- BEGIN op 10687 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 17.1, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'HDTV-720p' and "min_size" = 17 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10687

-- --- BEGIN op 10688 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBDL-1080p' and "min_size" = 13 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10688

-- --- BEGIN op 10689 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBDL-720p' and "min_size" = 13 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10689

-- --- BEGIN op 10690 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBRip-1080p' and "min_size" = 13 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10690

-- --- BEGIN op 10691 ( update radarr_quality_definitions "Movie" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'Movie' and "quality_name" = 'WEBRip-720p' and "min_size" = 13 and "max_size" = 0 and "preferred_size" = 1999;
-- --- END op 10691

-- --- BEGIN op 10692 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 25.2, "max_size" = 102, "preferred_size" = 101 where "name" = 'SQP Streaming' and "quality_name" = 'Bluray-720p' and "min_size" = 25 and "max_size" = 102 and "preferred_size" = 101;
-- --- END op 10692

-- --- BEGIN op 10693 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 13, "max_size" = 85, "preferred_size" = 84.7 where "name" = 'SQP Streaming' and "quality_name" = 'WEBDL-720p' and "min_size" = 13 and "max_size" = 86 and "preferred_size" = 85;
-- --- END op 10693

-- --- BEGIN op 10694 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 13, "max_size" = 85, "preferred_size" = 84.7 where "name" = 'SQP Streaming' and "quality_name" = 'WEBRip-720p' and "min_size" = 13 and "max_size" = 86 and "preferred_size" = 85;
-- --- END op 10694

-- --- BEGIN op 10695 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 85, "preferred_size" = 84.7 where "name" = 'SQP Streaming' and "quality_name" = 'WEBDL-720p' and "min_size" = 13 and "max_size" = 85 and "preferred_size" = 84.7;
-- --- END op 10695

-- --- BEGIN op 10696 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 85, "preferred_size" = 84.7 where "name" = 'SQP Streaming' and "quality_name" = 'WEBRip-720p' and "min_size" = 13 and "max_size" = 85 and "preferred_size" = 84.7;
-- --- END op 10696

-- --- BEGIN op 10697 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 85.7, "preferred_size" = 84.7 where "name" = 'SQP Streaming' and "quality_name" = 'WEBDL-720p' and "min_size" = 12.5 and "max_size" = 85 and "preferred_size" = 84.7;
-- --- END op 10697

-- --- BEGIN op 10698 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 85.7, "preferred_size" = 84.7 where "name" = 'SQP Streaming' and "quality_name" = 'WEBRip-720p' and "min_size" = 12.5 and "max_size" = 85 and "preferred_size" = 84.7;
-- --- END op 10698

-- --- BEGIN op 10699 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 33.8, "max_size" = 154, "preferred_size" = 153 where "name" = 'SQP Streaming' and "quality_name" = 'Bluray-1080p' and "min_size" = 34 and "max_size" = 154 and "preferred_size" = 153;
-- --- END op 10699

-- --- BEGIN op 10700 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 102, "preferred_size" = 101 where "name" = 'SQP Streaming' and "quality_name" = 'WEBDL-1080p' and "min_size" = 13 and "max_size" = 102 and "preferred_size" = 101;
-- --- END op 10700

-- --- BEGIN op 10701 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 102, "preferred_size" = 101 where "name" = 'SQP Streaming' and "quality_name" = 'WEBRip-1080p' and "min_size" = 13 and "max_size" = 102 and "preferred_size" = 101;
-- --- END op 10701

-- --- BEGIN op 10702 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 102, "max_size" = 204.4, "preferred_size" = 203.4 where "name" = 'SQP Streaming' and "quality_name" = 'Bluray-2160p' and "min_size" = 102 and "max_size" = 204 and "preferred_size" = 203;
-- --- END op 10702

-- --- BEGIN op 10703 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 34.5, "max_size" = 222.2, "preferred_size" = 221.2 where "name" = 'SQP Streaming' and "quality_name" = 'WEBDL-2160p' and "min_size" = 35 and "max_size" = 222 and "preferred_size" = 221;
-- --- END op 10703

-- --- BEGIN op 10704 ( update radarr_quality_definitions "SQP Streaming" )
update "radarr_quality_definitions" set "min_size" = 34.5, "max_size" = 222.2, "preferred_size" = 221.2 where "name" = 'SQP Streaming' and "quality_name" = 'WEBRip-2160p' and "min_size" = 35 and "max_size" = 222 and "preferred_size" = 221;
-- --- END op 10704

-- --- BEGIN op 10705 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 102, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'Bluray-2160p' and "min_size" = 102 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10705

-- --- BEGIN op 10706 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 85, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'HDTV-2160p' and "min_size" = 85 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10706

-- --- BEGIN op 10707 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 136.8, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'Remux-1080p' and "min_size" = 137 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10707

-- --- BEGIN op 10708 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 187.4, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'Remux-2160p' and "min_size" = 187 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10708

-- --- BEGIN op 10709 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'WEBDL-1080p' and "min_size" = 13 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10709

-- --- BEGIN op 10710 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 34.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'WEBDL-2160p' and "min_size" = 35 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10710

-- --- BEGIN op 10711 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 12.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'WEBRip-1080p' and "min_size" = 13 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10711

-- --- BEGIN op 10712 ( update radarr_quality_definitions "SQP UHD" )
update "radarr_quality_definitions" set "min_size" = 34.5, "max_size" = 0, "preferred_size" = 1999 where "name" = 'SQP UHD' and "quality_name" = 'WEBRip-2160p' and "min_size" = 35 and "max_size" = 2000 and "preferred_size" = 1999;
-- --- END op 10712

-- --- BEGIN op 10713 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 50, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Bluray-1080p' and "min_size" = 50 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10713

-- --- BEGIN op 10714 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 95, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Bluray-2160p' and "min_size" = 95 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10714

-- --- BEGIN op 10715 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 17.1, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Bluray-720p' and "min_size" = 17 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10715

-- --- BEGIN op 10716 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 15, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'HDTV-1080p' and "min_size" = 15 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10716

-- --- BEGIN op 10717 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 25, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'HDTV-2160p' and "min_size" = 25 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10717

-- --- BEGIN op 10718 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 10, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'HDTV-720p' and "min_size" = 10 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10718

-- --- BEGIN op 10719 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 69, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Remux-1080p' and "min_size" = 69 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10719

-- --- BEGIN op 10720 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 187, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Remux-2160p' and "min_size" = 187 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10720

-- --- BEGIN op 10721 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 15, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'WEBDL-1080p' and "min_size" = 15 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10721

-- --- BEGIN op 10722 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 25, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'WEBDL-2160p' and "min_size" = 25 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10722

-- --- BEGIN op 10723 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 10, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'WEBDL-720p' and "min_size" = 10 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10723

-- --- BEGIN op 10724 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 15, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'WEBRip-1080p' and "min_size" = 15 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10724

-- --- BEGIN op 10725 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 25, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'WEBRip-2160p' and "min_size" = 25 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10725

-- --- BEGIN op 10726 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 10, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'WEBRip-720p' and "min_size" = 10 and "max_size" = 1000 and "preferred_size" = 995;
-- --- END op 10726

-- --- BEGIN op 10727 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 50.4, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Bluray-1080p' and "min_size" = 50 and "max_size" = 0 and "preferred_size" = 995;
-- --- END op 10727

-- --- BEGIN op 10728 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 69.1, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Remux-1080p' and "min_size" = 69 and "max_size" = 0 and "preferred_size" = 995;
-- --- END op 10728

-- --- BEGIN op 10729 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 94.6, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Bluray-2160p' and "min_size" = 95 and "max_size" = 0 and "preferred_size" = 995;
-- --- END op 10729

-- --- BEGIN op 10730 ( update sonarr_quality_definitions "Series" )
update "sonarr_quality_definitions" set "min_size" = 187.4, "max_size" = 0, "preferred_size" = 995 where "name" = 'Series' and "quality_name" = 'Remux-2160p' and "min_size" = 187 and "max_size" = 0 and "preferred_size" = 995;
-- --- END op 10730
